0 5 10 15 20 1 1.05 1.1 h [m]

Setpoint increase of h h h_s

0 5 10 15 20

0.05

0.055

0.06 cA [kmol/m3]

c_A c_{As}

0 5 10 15 20 1 1.5 2 q_1 [m^3/min]

0 5 10 15 20 Time [min]

0 0.5 1 q_2 [m^3/min]

0 5 10 15 20

0.985

0.99

0.995 1 h [m]

Setpoint increase of c_A h h_s

0 5 10 15 20

0.05

0.052

0.054

0.056 cA [kmol/m3]

c_A c_{As}

0 5 10 15 20 1

1.1

1.2 q_1 [m^3/min]

0 5 10 15 20 Time [min] 1 1.2 1.4 1.6 q_2 [m^3/min]